From dd5bfb6f3ec792b966ffb1cfaae1799b47579c02 Mon Sep 17 00:00:00 2001
From: tmk <tmk@users.noreply.github.com>
Date: Thu, 17 Dec 2015 13:48:33 +0900
Subject: Created Test for ASCIIDOC (asciidoc)

---
 Test-for-ASCIIDOC.asciidoc | 17 +++++++++++++++++
 1 file changed, 17 insertions(+)
 create mode 100644 Test-for-ASCIIDOC.asciidoc

(limited to 'Test-for-ASCIIDOC.asciidoc')

diff --git a/Test-for-ASCIIDOC.asciidoc b/Test-for-ASCIIDOC.asciidoc
new file mode 100644
index 0000000000..ce57d2781b
--- /dev/null
+++ b/Test-for-ASCIIDOC.asciidoc
@@ -0,0 +1,17 @@
+
+
+
+.Makefile
+[source,Makefile]
+----
+# Build Options
+#   comment out to disable the options.
+#
+BOOTMAGIC_ENABLE = yes  # Virtual DIP switch configuration(+1000)
+MOUSEKEY_ENABLE = yes   # Mouse keys(+4700)
+EXTRAKEY_ENABLE = yes   # Audio control and System control(+450)
+CONSOLE_ENABLE = yes    # Console for debug(+400)
+COMMAND_ENABLE = yes    # Commands for debug and configuration
+#SLEEP_LED_ENABLE = yes  # Breathing sleep LED during USB suspend
+NKRO_ENABLE = yes       # USB Nkey Rollover - not yet supported in LUFA
+----
\ No newline at end of file
-- 
cgit v1.2.1

